5 10 15 )c (GeV/ Tp 3−10

2−10

1−10

1

Efficiency × Acceptance

Prompt D

Feed-down D

ALICE

+π^+K^- K

→ ^+πϕ→ ^+_sD

0-10% Pb-Pb = 5.02 TeV NNs